
01

                             CORRELATION MATRIX


   This program enables you to compute the means, standard deviations, and
   correlations for 51 or fewer variables. Final results are stored on an
   external file which you must designate. 

   You may input a raw data file that has 200 or fewer variables and then 
   select the variables which you wish to use in computing the correlation
   matrix. There is no limit on the number of cases that may be read from
   the input file(s).

   The procedure requires use of a raw data input file. If you want to
   learn how to construct such input data files, return to the main menu
   and select the "Learn" option. Information will then be provided in
   regards to the use of missing data codes and case or variable deletion
   options.
= 
n the number of cases, the number of variables, and the
   letter R or S 