01

                         UNIVARIATE SUMMARY STATISTICS

   This procedure enables you to select up to 50 variables from raw data
   input records having 200 or fewer variables. The procedure then com-
   putes the arithmetic mean, biased and unbiased standard deviations,
   skewness, kurtosis, minimum and maximum values, the range, and the
   geometric and harmonic means.

   The procedure requires use of a raw data input file. If you want to
   learn how to construct such input data files, return to the main menu
   and select the "Learn" option. Information will then be provided in
   regards to the use of missing data codes and case or variable deletion
   options.
=
42.769  293.6  279.8  120.445  1957
 66.513  110.8  444.546  468.1 