The MORE command reads from the standard input device and sends one screen
of information to the standard output device, then waits for a key press
to continue with the next page.  The concept of standard input and output
and its redirection is described in the help file REDIRECT.  It would be a
good idea to understand those concepts before continuing on with this command.
The command format is as follows:

          MORE [<input-source]

The input-source can be a filespec ([d:][path]filname[.ext]) preceded by
the standard input redirection symbol "<" or may come from a piped command
(see the help file PIPING and the second example below for details).

Examples:

MORE <MYFILE.DOC  - Displays the file MYFILE.DOC a screen full at a time then
                    waits with a prompt for a key to be pressed so the next
                    screen full may be displayed.

DIR |MORE  - Displays the output of a DIR command one screen full at a time.
d lines per inch (6 or 8).
   P  - Perform a con