; Contents ---------------------------------------------------------------
;
;   fingerd.def -- Module Definition File
;
;   Version 1.0 Windows Socket Finger Daemon
;
;   Copyright (C) Frederick W. Bent 1994
;   All rights reserved.
;
;
; Description
;
;	Delcares the local heap and stack size for the finger daemon.
;	Also explicitly exports the callback functions.
;
; Ends -------------------------------------------------------------------

; History ----------------------------------------------------------------
;
; 6/28/94  1.0  Fred Bent     	Started implementation
;
; Ends -------------------------------------------------------------------

NAME         FINGERD
DESCRIPTION  'Windows Socket Finger Daemon - v1.00'
EXETYPE      WINDOWS
STUB         'WINSTUB.EXE'
CODE         PRELOAD MOVEABLE DISCARDABLE
DATA         PRELOAD MOVEABLE MULTIPLE
HEAPSIZE     28672
STACKSIZE    16384
EXPORTS
             FrameWndProc
	     AboutDlgProc
	     DlgProc
	     NetWndProc






